0 10 20 30 40 50 60 70 80 0

2

4

6

8

10

12

14 x 10^4 Casc. On-Off Param. Est., Off Peak Sess. 2

Time (sec)

Size (bytes)

Param. est’s based on n = 4 True Peak rate = 19.375 x 10^6 meanrate = 1465.4176 λ = 906.4702 μ = 93.2286

0 10 20 30 40 50 60 70 80 0

2

4

6

8

10

12

14 x 10^4 5 Casc. On-Off Simulated Traces

Time (sec)

Jumps "rounded" off