0 0.2 0.4 0.6 0.8 1 0

0.2

0.4

0.6

0.8

1 ICC C.D.F., .5+.3*(+-1) Gen.

time cumulative rate

level n = 13

0 0.2 0.4 0.6 0.8 1 0 2 4 6 8 10 12 14 16 x 10^4ICC Rate function, .5+.3*(+-1) Gen.

time

Ri(t)

0 0.2 0.4 0.6 0.8 1 -4

-2

0

2

4

6 log_{10} ICC Rate function, .5+.3*(+-1) Gen.

time log10(Ri(t))

0 0.2 0.4 0.6 0.8 1 0

0.5

1

1.5

2

2.5 x 10^6ICC Rate function, .5+.3*(+-1) Gen.

time