-4 -2 0 0

2

4

6

8

10 log_{10} widths

SiZer, knot # 4

log10(h)

-4 -2 0

-1.5

-1

-0.5

0

0.5

-1 0 1 2 3 0 1 2 3 4 5 6 7 8 9 log_{10} slope ratios

SiZer, knot # 4

-1 0 1 2 3

-1.5

-1

-0.5

0

0.5

0 0.005 0.01 0.015 0

1000

2000

3000

4000

5000

abs. residual area

SiZer, knot # 4

0 5 10 15 x 10^{-3}

-4

-3.5

-3

-2.5

-2

-5 0 5 x 10^{-3}

0 500 1000

1500

2000

2500

3000

3500

residual area

SiZer, knot # 4

-5 0 5 x 10^{-3}

-4

-3.5

-3

-2.5

-2