0 10 20 30 40 50 60 70 80 90 100 0 2 4 Good Circulation

0 10 20 30 40 50 60 70 80 90 100 0 2 4 Sticky States

0 10 20 30 40 50 60 70 80 90 100 0 2 4 Jump Away Fast

0 10 20 30 40 50 60 70 80 90 100 0 2 4 Nearly Cyclic