0 20 40 0 0.1 0.2 Raw Data, ToySpect P2 D31

0 20 40 0 0.1 0.2 Reconstructed Data

% Tot SS = 99.3648

0 20 40 0 0.1 0.2 Spec Dec Comp. 1

% Tot SS = 75.3265

0 10 20 30 40 0 0.2 0.4 0.6 0.8 Spec Dec Coeff. 1

0 20 40 0

0.05

0.1 Spec Dec Resid. 1

% Tot SS = 4.6084

0 20 40 0

0.05

0.1 Spec Dec Comp. 2

% Tot SS = 4.4239

0 10 20 30 40 0 0.1 0.2

Spec Dec Coeff. 2

0 20 40 0 2 4 x 10_{-3} Spec Dec Resid. 2

% Tot SS = 0.0055689

0 20 40 0 1 2 3 x 10_{-3} Spec Dec Comp. 3

% Tot SS = 0.0015944

0 10 20 30 40 0 2 4 6 8 x 10_{-3} Spec Dec Coeff. 3

0 20 40 0 2 4 x 10_{-3} Spec Dec Resid. 3

% Tot SS = 0.0025996

0 20 40 0 2 4 6 8 x 10_{-5} Spec Dec Comp. 4

% Tot SS = 2.1244e-006

0 10 20 30 40 0

1

2 x 10_{-4} Spec Dec Coeff. 4

0 20 40 0 2 4 x 10_{-3} Spec Dec Resid. 4

% Tot SS = 0.002486