-20 0 20 0 0.02

0.04 Rosetta Stanford

Scores kde, PC1

-60-40-20 0 20 0 0.02

0.04

Scores kde, PC2

0 20 40 0

0.05

Scores kde, PC3

0 50 100 0

0.05

Scores kde, PC4

-20-10 0 10 0

0.05

Scores kde, PC5

-20 0 20 0

0.05

Scores kde, PC6

-60-40-20 0 20 -20 0 20

pc2 pc1

2D Scores plot

0 20 40 -20 0 20

pc3

2D Scores plot

0 50 100 -20 0 20

pc4

2D Scores plot

-20-10 0 10 -20 0 20

pc5

2D Scores plot

-20 0 20 -20 0 20

pc6

2D Scores plot

-20 0 20 -60 -40 -20 0 20

pc1 pc2

2D Scores plot

0 20 40 -60 -40 -20 0 20

pc3

2D Scores plot

0 50 100 -60 -40 -20 0 20

pc4

2D Scores plot

-20-10 0 10 -60 -40 -20 0 20

pc5

2D Scores plot

-20 0 20 -60 -40 -20 0 20

pc6

2D Scores plot

-20 0 20 0 20 40

pc1 pc3

2D Scores plot

-60-40-20 0 20 0 20 40

pc2

2D Scores plot

0 50 100 0 20 40

pc4

2D Scores plot

-20-10 0 10 0 20 40

pc5

2D Scores plot

-20 0 20 0 20 40

pc6

2D Scores plot

-20 0 20 0 50 100

pc1 pc4

2D Scores plot

-60-40-20 0 20 0 50 100

pc2

2D Scores plot

0 20 40 0 50 100

pc3

2D Scores plot

-20-10 0 10 0 50 100

pc5

2D Scores plot

-20 0 20 0 50 100

pc6

2D Scores plot

-20 0 20 -20 -10 0 10

pc1 pc5

2D Scores plot

-60-40-20 0 20 -20 -10 0 10

pc2

2D Scores plot

0 20 40 -20 -10 0 10

pc3

2D Scores plot

0 50 100 -20 -10 0 10

pc4

2D Scores plot

-20 0 20 -20 -10 0 10

pc6

2D Scores plot

-20 0 20 -20 0 20

pc1 pc6

2D Scores plot

-60-40-20 0 20 -20 0 20

pc2

2D Scores plot

0 20 40 -20 0 20

pc3

2D Scores plot

0 50 100 -20 0 20

pc4

2D Scores plot

-20-10 0 10 -20 0 20

pc5

2D Scores plot