-2 -1 0 1 2 0

0.1

0.2

0.3

Data Coordinate Directions

Data Coor. 1

-2 -1 0 1 2 0 0.05 0.1 0.15 0.2 0.25 0.3

Data Coor. 2

-2 -1 0 1 2 0 0.1 0.2 0.3 0.4

Data Coor. 3

-2 -1 0 1 2 -2 -1 0 1 2 Standard normal

Data Coor. 2

Data Coor. 1

-2 -1 0 1 2 -2 -1 0 1 2

Data Coor. 3

-2 -1 0 1 2 -2 -1 0 1 2

Data Coor. 1

Data Coor. 2

-2 -1 0 1 2 -2 -1 0 1 2

Data Coor. 3

-2 -1 0 1 2 -2 -1 0 1 2

Data Coor. 1

Data Coor. 3

-2 -1 0 1 2 -2 -1 0 1 2

Data Coor. 2