80 100 120 140 160 180 200 0 0.005

0.01

0.015

0.02

0.025

0.03

time (min) time (min) log10(h)

80 100 120 140 160 180 200 0 0.5 1 1.5 2

time (min)

80 100 120 140 160 180 200 0 0.5 1 1.5 2