5 10

0

20

40 Raw Data

Parabs & 2 Outliers

5 10

0

20

40 Center: Ell. L1M 87.03% of Tot

5 10 -20 0 20 Center Resid. 12.97% of Tot

0 5 10 0

0.5

1 PC R-squareds

PC #

R2

Elliptical PCA

5 10 -20 0 20 PC1 Proj.

5 10 0

20 40 Center +- PC1

64.61% of CR

5 10 -20 0 20 Resid, PC1

35.39% of above

-40 -20 0 20 0 0.01 0.02

Scores kde, PC1

5 10 -20 0 20 PC2 Proj.

5 10 0

20

40 Center +- PC2

11.26% of CR

5 10 -20 0 20 Resid, PC2

82.58% of above

-10 0 10 20 0 0.02 0.04 0.06 Scores kde, PC2

5 10 -20 0 20 PC3 Proj.

5 10 0

20

40 Center +- PC3

9.241% of CR

5 10 -20 0 20 Resid, PC3

17.9% of above

-30 -20 -10 0 0 0.1 0.2

Scores kde, PC3

5 10 -20 0 20 PC4 Proj.

5 10 0

20

40 Center +- PC4

7.539% of CR

5 10 -20 0 20 Resid, PC4

18.42% of above

0 10 20 30 0 0.1 0.2 0.3 Scores kde, PC4