-4 -3 -2 -1 0 1 2 3 4 -2 -1 0 1 2 Linear SVM, C = 10_{-6} , dimension = 39

-4 -2 0 2 4 0 0.1 0.2 0.3 0.4 True Projection

-4 -2 0 2 4 0 0.2 0.4 0.6 Est’d Projection