10 20 30 40 50 60 70 80 0

0.02

0.04

0.06

0.08

0.1 Density Estimates, Device Lifetimes

Density SiZer Map

log10(h)

0 20 40 60 80

0

0.5

1

1.5

2

10 20 30 40 50 60 70 80 0

0.5

1

1.5

2

2.5 Hazard Estimates, Device Lifetimes

Hazard SiZer Map

0 20 40 60 80

0

0.5

1

1.5

2