200 400 600 800 1000 1200 1400 1600 0 1 2 3 4 5 6 7 x 10^{-3}

Density Estimates, Heart Transplants

Days to death

Density SiZer Map

Days to death log10(h)

0 500 1000 1500 1

1.5

2

2.5

3

200 400 600 800 1000 1200 1400 1600 0 1 2 3 4 5 6 7 8 x 10^{-3}

Hazard Estimates, Heart Transplants

Days to death

Hazard SiZer Map

Days to death

0 500 1000 1500 1

1.5

2

2.5

3